SCHEDULES

SCHEDULE 12 PROTECTIVE PROVISIONS

PART 1 FOR THE PROTECTION OF ELECTRICITY, GAS, WATER AND SEWERAGE UNDERTAKERS
3 This Part does not apply to apparatus in respect of which the relations between the undertaker and the utility undertaker are regulated by the provisions of Part 3 of the 1991 Act.