SCHEDULES

SCHEDULE 9 PROTECTIVE PROVISIONS

PART 3 FOR THE PROTECTION OF NATIONAL GRID AS ELECTRICITY AND GAS UNDERTAKER

21 Protective works to buildings
(1) The undertaker, in the case of the powers conferred by article 33 (protective works to buildings), must exercise those powers so as not to obstruct or render less convenient the access to any apparatus without the written consent of National Grid and, if by reason of the exercise of those powers any damage to any apparatus (other than apparatus the repair of which is not reasonably necessary in view of its intended removal or abandonment) or property of National Grid or any interruption in the supply of electricity and/or gas, as the case may be, by National Grid is caused, the undertaker must bear and pay on demand the cost reasonably incurred by National Grid in making good such damage or restoring the supply; and, subject to sub-paragraph (2), must—
(a) pay compensation to National Grid for any loss sustained by it; and
(b) indemnify National Grid against all claims, demands, proceedings, costs, damages and expenses which may be made or taken against or recovered from or incurred by that undertaker, by reason of any such damage or interruption.
(2) Nothing in this paragraph imposes any liability on the undertaker with respect to any damage or interruption to the extent that such damage or interruption is attributable to the act, neglect or default of National Grid or its contractors or workmen; and National Grid will give to the undertaker reasonable notice of any claim or demand as aforesaid and no settlement or compromise thereof may be made by National Grid, save in respect of any payment required under a statutory compensation scheme, without first consulting the undertaker and giving the undertaker an opportunity to make representations as to the claim or demand.
Words in Sch. 9 para. 21(2) substituted (17.5.2021) by The Immingham Open Cycle Gas Turbine (Correction) Order 2021 (S.I. 2021/581), art. 1, Sch.
Sch. 9 para. 21 in force at 1.9.2020, see art. 1