SCHEDULE 3 Special identification mark
2 If the single oval stamp referred to in paragraph (1)(b) is used—
(a) the letters must be at least 0.8 cm high;
(b) the figures must be at least 1 cm high; and
(c) the application of the mark must be supervised by an officer of the Meat Hygiene Service.