2 Appointed day
1 August 2014 is the appointed day for the coming into force of the repeal of section 7B of the Local Authority Social Services Act 1970 (complaints procedure) as provided for by the entry in Part 2 of Schedule 14 to the Act and section 196 of the Act in so far as it relates to that repeal.
1970 c.42.