1 Title, commencement and interpretation
1 The title of these Regulations is the National Health Service (Temporary Disapplication of Tenure of Office) (Wales) (Coronavirus) Regulations 2020.
2 These Regulations come into force on 5 July 2020.
3 In these Regulations, “the relevant period” means the period starting with the day these Regulations come into force and ending on 31 March 2021.